h1 Entries 169 Mean 1.107 RMS 0.3929

Number of strips

1 2 3 4 5 6 7 8 9 10

%

0 10 20 30 40 50 60 70 80 90 ladder==11

h2 Entries 1530 Mean 3.646 RMS 2.238

Number of strips

1 2 3 4 5 6 7 8 9 10

%

4 6 8 10 12 14 16 18 ladder==11